m = 4 m = 8

E = -5.5027 m = 16m = 30m = 40

E = -8.6233

E = -11.6349

E = -14.6464

E = -17.6470

E = -18.2384

E = -19.5198

E = -22.6829

E = -25.6752

E = -28.6687

E = -31.6546

E = -36.9358 m = 62m = 70

E = -37.4474

E = -37.9222

E = -38.3477

E = -38.6998

E = -38.9860

E = -41.3966

E = -43.9741

E = -44.1240

E = -44.3712

E = -44.6050

E = -44.8086

E = -44.8567

E = -44.8579

E = -44.8705

E = -44.8849

E = -44.9094

E = -45.3968

E = -46.8683

E = -47.7499

E = -47.8070

E = -47.8697

E = -47.9182

E = -47.9244

E = -47.9249

E = -47.9276

E = -47.9331

E = -47.9415

E = -49.0900

E = -49.9957

E = -50.0801

E = -50.1017

E = -50.1034

E = -50.1036

E = -50.1039

E = -50.1044

E = -50.1054

E = -50.5532

E = -51.1559

E = -51.8051

E = -52.1485

E = -52.1518

E = -52.1527

E = -49.8864

E = -48.5742

E = -48.5785

E = -48.5794

E = -48.6004

E = -48.9782

E = -49.1526

E = -49.5552

E = -49.7093

E = -49.7102

E = -49.7100

E = -47.4368

E = -46.1209

E = -46.1319

E = -46.1329

E = -46.1330

E = -46.2376

E = -46.4692

E = -46.5533

E = -46.7280

E = -46.7303

E = -46.7304

E = -46.7314

E = -46.7315 m = 127 m = 135

E = -46.7384

E = -46.7477

E = -46.7555

E = -46.7819

E = -46.9965

E = -47.2014

E = -47.4632

E = -47.5739

E = -47.5823

E = -47.5896

E = -47.6023

E = -47.6023 m = 200

E = -47.6116

E = -47.6173

E = -47.6256

E = -47.7576

E = -47.9898

E = -48.1453

E = -48.3412

E = -48.4305

E = -48.4379

E = -48.4436

E = -48.4493

E = -48.4494

E = -48.4512

E = -48.4525

E = -48.5459

E = -48.6621

E = -48.7709

E = -48.8410

E = -48.9430

E = -49.0420

E = -49.0447

E = -49.0471

E = -49.0470

E = -49.0473

E = -49.0476

E = -49.0574

E = -49.0995

E = -49.1622

E = -49.1941

E = -49.2385

E = -49.2830

E = -49.3205

E = -49.3208

E = -49.3209

E = -49.3211

E = -49.3341

E = -49.3686

E = -49.3994

E = -49.4134

E = -49.4330

E = -49.4549

E = -49.4679

E = -49.4696

E = -49.4693

E = -49.4695

E = -49.4754

E = -49.4933

E = -49.5087

E = -49.5218

E = -49.5379

E = -49.5475

E = -49.5621

E = -49.5629

E = -49.5628

E = -49.5628 m = 250

E = -49.5639

E = -49.5650

E = -49.5728

E = -49.6014

E = -49.6373

E = -49.6776

E = -49.7371

E = -49.7524

E = -49.7573

E = -49.7581

E = -49.7581 m = 256 m = 300

E = -49.7589

E = -49.7634

E = -49.7814

E = -49.8168

E = -49.8409

E = -49.8711

E = -49.8956

E = -49.9108

E = -49.9198

E = -49.9209

E = -49.9208

E = -49.9210

E = -49.9211

E = -49.9402

E = -49.9576

E = -49.9637

E = -49.9746

E = -49.9819

E = -49.9945

E = -50.0028

E = -50.0081

E = -50.0082

E = -50.0089

E = -50.0138

E = -50.0225

E = -50.0274

E = -50.0326

E = -50.0367

E = -50.0405

E = -50.0579

E = -50.0626

E = -50.0625

E = -50.0710

E = -50.0786

E = -50.0840

E = -50.0880

E = -50.0916

E = -50.0963

E = -50.0995

E = -50.1011

E = -50.1012

E = -50.1014

E = -50.1050

E = -50.1100

E = -50.1131

E = -50.1172

E = -50.1192

E = -50.1223

E = -50.1242

E = -50.1282

E = -50.1281

E = -50.1281 m = 350

E = -50.1285

E = -50.1314

E = -50.1431

E = -50.1603

E = -50.1778

E = -50.1943

E = -50.2131

E = -50.2243

E = -50.2281

E = -50.2290

E = -50.2290 m = 400

E = -50.2296

E = -50.2349

E = -50.2452

E = -50.2608

E = -50.2756

E = -50.2922

E = -50.3065

E = -50.3152

E = -50.3191

E = -50.3193

E = -50.3194

E = -50.3200

E = -50.3256

E = -50.3292

E = -50.3356

E = -50.3402

E = -50.3466

E = -50.3492

E = -50.3500

E = -50.3521

E = -50.3522

E = -50.3548

E = -50.3583

E = -50.3607

E = -50.3646

E = -50.3690

E = -50.3716

E = -50.3726

E = -50.3742

E = -50.3748

E = -50.3751

E = -50.3788

E = -50.3817

E = -50.3834

E = -50.3846

E = -50.3889

E = -50.3913

E = -50.3910

E = -50.3931

E = -50.3937

E = -50.3939

E = -50.3962

E = -50.4006

E = -50.4026

E = -50.4054

E = -50.4084

E = -50.4096

E = -50.4105

E = -50.4099

E = -50.4121

E = -50.4121 m = 500

E = -50.4127

E = -50.4203

E = -50.4358

E = -50.4540

E = -50.4752

E = -50.4953

E = -50.5155

E = -50.5311

E = -50.5363

E = -50.5414

E = -50.5416 m = 569 m = 600

E = -50.5419

E = -50.5518

E = -50.5628

E = -50.5792

E = -50.5989

E = -50.6171

E = -50.6357

E = -50.6528

E = -50.6620

E = -50.6675

E = -50.6689

E = -50.6692

E = -50.6704

E = -50.6777

E = -50.6841

E = -50.6888

E = -50.6950

E = -50.7016

E = -50.7069

E = -50.7125

E = -50.7155

E = -50.7213

E = -50.7240

E = -50.7242

E = -50.7284

E = -50.7324

E = -50.7364

E = -50.7413

E = -50.7464

E = -50.7511

E = -50.7557

E = -50.7573

E = -50.7589

E = -50.7643

E = -50.7652

E = -50.7717

E = -50.7761

E = -50.7783

E = -50.7836

E = -50.7882

E = -50.7917

E = -50.7962

E = -50.7988

E = -50.8006

E = -50.8019

E = -50.8032

E = -50.8055

E = -50.8103

E = -50.8141

E = -50.8182

E = -50.8240

E = -50.8284

E = -50.8317

E = -50.8320

E = -50.8350

E = -50.8351 m = 800

E = -50.8354

E = -50.8399

E = -50.8518

E = -50.8756

E = -50.8961

E = -50.9164

E = -50.9328

E = -50.9555

E = -50.9745

E = -50.9816

E = -50.9840

E = -50.9840 m = 1000

E = -50.9853

E = -50.9914

E = -51.0094

E = -51.0283

E = -51.0425

E = -51.0589

E = -51.0729

E = -51.0944

E = -51.1069

E = -51.1114

E = -51.1128

E = -51.1143

E = -51.1176

E = -51.1255

E = -51.1333

E = -51.1382

E = -51.1424

E = -51.1479

E = -51.1552

E = -51.1604

E = -51.1629

E = -51.1632

E = -51.1659

E = -51.1710

E = -51.1752

E = -51.1781

E = -51.1806

E = -51.1831

E = -51.1895

E = -51.1939

E = -51.1964

E = -51.1975

E = -51.1982

E = -51.2007

E = -51.2111

E = -51.2172

E = -51.2202

E = -51.2217

E = -51.2242

E = -51.2282

E = -51.2305

E = -51.2326

E = -51.2325

E = -51.2343

E = -51.2373

E = -51.2407

E = -51.2426

E = -51.2440

E = -51.2454

E = -51.2515

E = -51.2639

E = -51.2740

E = -51.2793

E = -51.2797 m = 1250

E = -51.2812

E = -51.2892

E = -51.3179

E = -51.3509

E = -51.3638

E = -51.3706

E = -51.3781

E = -51.3903

E = -51.4026

E = -51.4084

E = -51.4097

E = -51.4097 m = 1500

E = -51.4124

E = -51.4206

E = -51.4334

E = -51.4415

E = -51.4465

E = -51.4520

E = -51.4626

E = -51.4841

E = -51.5007

E = -51.5078

E = -51.5081

E = -51.5084

E = -51.5116

E = -51.5202

E = -51.5295

E = -51.5325

E = -51.5339

E = -51.5355

E = -51.5386

E = -51.5428

E = -51.5451

E = -51.5464

E = -51.5472

E = -51.5495

E = -51.5526

E = -51.5542

E = -51.5547

E = -51.5554

E = -51.5573

E = -51.5612

E = -51.5654

E = -51.5683

E = -51.5686

E = -51.5697

E = -51.5724

E = -51.5762

E = -51.5778

E = -51.5783

E = -51.5787

E = -51.5798

E = -51.5819

E = -51.5831

E = -51.5837

E = -51.5842

E = -51.5857

E = -51.5876

E = -51.5883

E = -51.5882

E = -51.5885

E = -51.5896

E = -51.5916

E = -51.5939

E = -51.5948

E = -51.5950

E = -51.5951 m = 1850

E = -51.5967